<chr_var letter="S" var="1">S1</chr_var> i la cole. <chr_abbr type="frq" class="ss" expan="et" cert="yes">et1</chr_abbr> <chr_var letter="s" var="long">∫</chr_var>alue. <chr_abbr type="frq" class="ss" expan="et" cert="yes">et1</chr_abbr> be<chr_var letter="s" var="long">∫</chr_var>e. 